Hemochromatosis: Iron Overload Signs, Organ Harm, Phlebotomy Therapy

Hemochromatosis, a condition involving excessive iron buildup, represents a serious metabolic disorder where the body absorbs far more iron from food sources than it requires, resulting in a progressive accumulation within various organs and tissues throughout the system. Without appropriate medical intervention, this surplus iron can inflict substantial harm on critical organs, potentially leading to […]
Source